Eta 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 3

Radiation lengths (%)

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 Sensor

Eta 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 3

Radiation lengths (%)

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 Hybrid

Eta 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 3

Radiation lengths (%)

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 Spine

Eta 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 3

Radiation lengths (%)

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 Connector