Eta 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 3

Radiation lengths (%)

0

5

10

15

20

25_{Fibres+Npipes+rails}

LMT+LMTcooling

Cylinder cooling

Support cylinder