z / mm

500 1000 1500 2000 2500 3000 3500

Radiation lengths (%)

0

0.5

1

1.5

2

2.5

3 Support cylinder

z / mm

500 1000 1500 2000 2500 3000 3500

Radiation lengths (%)

0

0.5

1

1.5

2

2.5

3 Cylinder cooling

z / mm

500 1000 1500 2000 2500 3000 3500

Radiation lengths (%)

0

0.5

1

1.5

2

2.5

3 LMT+LMTcooling

z / mm

500 1000 1500 2000 2500 3000 3500

Radiation lengths (%)

0

0.5

1

1.5

2

2.5

3 Fibres+Npipes+rails