Eta 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 3

Radiation lengths (%)

0 1 2

3 4

5 6 7 Optoharness+FSI

Eta 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 3

Radiation lengths (%)

0 1 2

3 4

5 6 7 Disc tapes + patch panels

Eta 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 3

Radiation lengths (%)

0 1 2

3 4

5 6 7 Disc cooling

Eta 1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 3

Radiation lengths (%)

0 1 2

3 4

5 6 7 Disc support+fixations