Eta -2 -1.5 -1 -0.5 0 0.5 1 1.5 2

Radiation lengths (%)

0 1 2 3 4 5 6 7 8 Harness+doglegs+clamps

Eta -2 -1.5 -1 -0.5 0 0.5 1 1.5 2

Radiation lengths (%)

0 1 2 3 4 5 6 7 8 Brackets

Eta -2 -1.5 -1 -0.5 0 0.5 1 1.5 2

Radiation lengths (%)

0 1 2 3 4 5 6 7 8 Cooling

Eta -2 -1.5 -1 -0.5 0 0.5 1 1.5 2

Radiation lengths (%)

0 1 2 3 4 5 6 7 8 Cylinder+flange