z / mm

-1000-800-600-400-200 0 200 400 600 800 1000

Radiation lengths (%)

0 2 4 6 8 10 12 14 16 18 20 Thermal Shield

z / mm

-1000-800-600-400-200 0 200 400 600 800 1000

Radiation lengths (%)

0 2 4 6 8 10 12 14 16 18 20 Interlinks

z / mm

-1000-800-600-400-200 0 200 400 600 800 1000

Radiation lengths (%)

0 2 4 6 8 10 12 14 16 18 20 Spiders

z / mm

-1000-800-600-400-200 0 200 400 600 800 1000

Radiation lengths (%)

0 10 20 30 40 50 60 70 80 90 100 HSP

z / mm

-1000-800-600-400-200 0 200 400 600 800 1000

Radiation lengths (%)

0 1 2 3 4 5 6 7 8 9 10 PPB1

z / mm

-3000 -2000 -1000 0 1000 2000 3000

Radiation lengths (%)

0 1 2 3 4 5 6 7 8 9 10 Cryostat Services